Copyright: Copyright © 1995 Gamma Software.
Citation: All rights reserved.


Contents
GammaCAD PRO Installation

The install program displays a menu which allows you to enter the destination directory for the install. The default destination is usually correct. To use it, press Enter or click on "OK".  If you wish to install the software to a different directory,  type in the path in which you wish to place the software and press Enter.

Click on the "Cancel" button to leave the install without installing the software.

After the GammaCAD installation menu is completed, the install will copy the files from the source drive to the destination directory.  After all the files have been copied, the install will create a Program Manager group and add the program icons to that group.

Select "Exit" from the "File" menu to return to the install.